\chapter{EQUIPMENT}
\label{APP_C:EQUIPMENT}



\minitoc

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%  SECTION BARU 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\fontsize{12}{12}\selectfont

\section{Laboratory Equipment}
\label{SEC:EQUIPMENT_LABORATORIES}

In the EE Department, there are
many equipment, which are available in the laboratories.
The available equipment are deployed in each laboratory as follows.


%%%%%%%%%=======================================
%%%%%%%%%========== SUBSECTION BARU ============
\subsection{\labmesin}
\label{SUBSEC:EQUIPMENT_LAB_MESIN}

\begin{table}
\caption{Equipment in Electric Machines Laboratory}
\label{TABLE:EQUIPMENT_LAB_MESIN}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

\newpage
%%%%%%%%%=======================================
%%%%%%%%%========== SUBSECTION BARU ============
\subsection{\labelvis}
\label{SUBSEC:EQUIPMENT_LAB_ELVIS}

The \labelvis ~houses some manufacture and measurement equipment.
The equipment are used in some courses and practical courses, and to support design projects from some course assignment including the final bachelor project. 
Table~\ref{TABLE:EQUIPMENT_LAB_ELVIS} presents some equipment, their functionality and their
related courses that use them.
In the \labelvis, there is a set of PCB manufacture equipment (See Figure~\ref{FIG:PCB_MANUFACTURE}).

Beside the equipment presented in Table~\ref{TABLE:EQUIPMENT_LAB_ELVIS}, in the \labelvis ~there are also electronic breadboards, multimeters, soldering tools, electronic development kits/boards, such as FPGA, microcontroller and embedded microprocessor development kits, passive and active electric/electronic components/devices to complete laboratory assignments. 

\begin{table}[h]
\caption{Equipment in Electronics and Devices Laboratory}
\label{TABLE:EQUIPMENT_LAB_ELVIS}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Functionality  \\
\hline
1 & PCB Manufacture Equipment Set & 1 & 
to assembly and manufacture PCB   \\

2 & 3D Printer & 2 & 
to make 3D profiles  \\

3 & Stereo-lithography 3D Printer & 1 & 
to make 3D profiles   \\

4 & Mixed-Signal Oscilloscope, 4 channels & 1 & to measure analog and digital signals   \\

5 & Analog Oscilloscope, 2 channels & 3 &  
to measure analog signals   \\

6 & Digital Storage Oscilloscope, 4 channel & 2 &
to measure analog and digital signals   \\

7 & Digital Storage Oscilloscope, 2 channel & 1 &
to measure analog and digital signals   \\
8 & Function Generator & 3 & 
to generate signal waveform   \\

9 & Frequency Generator & 1 & 
to generate signal with variable frequency   \\

10 & PC Oscilloscope, 2 channel & 1 & 
to measure analog and digital signals   \\

11 & Small-scale CNC Machine & 1 & 
to make alloy-made profile   \\

12 & Power Supply & 8 & 
to supply power for electronic equipment \\
\hline
\end{tabular}
\end{table}


\begin{figure}
\centering
\includegraphics[width=0.9\columnwidth]{ISI/APPENDIX_C/FIG_ELVIS/PCB_MANUFACTURE.JPG}
\caption{PCB Manufacture Equipment.}
\label{FIG:PCB_MANUFACTURE}
\end{figure}

%%%%%%%%%=======================================
%%%%%%%%%========== SUBSECTION BARU ============
\subsection{\labinstalasi}
\label{SUBSEC:EQUIPMENT_LAB_INSTALASI}

\begin{table}
\caption{Equipment in Electrical Installation Laboratory}
\label{TABLE:EQUIPMENT_LAB_INSTALASI}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

%%%%%%%%%=======================================
%%%%%%%%%========== SUBSECTION BARU ============
\subsection{\labrelay}
\label{SUBSEC:EQUIPMENT_LAB_RELAY}

\begin{table}
\caption{Equipment in Relay and Measurement Laboratory}
\label{TABLE:EQUIPMENT_LAB_RELAY}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

%%%%%%%%%=======================================
%%%%%%%%%=========== SUBSECTION BARU ===========
\subsection{\labstl}
\label{SUBSEC:EQUIPMENT_LAB_STL}

\begin{table}
\caption{Equipment in Power System Laboratory}
\label{TABLE:EQUIPMENT_LAB_POWER}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

%%%%%%%%%=======================================
%%%%%%%%%======== SUBSECTION BARU ==============
\subsection{\lablld}
\label{SUBSEC:EQUIPMENT_LAB_LLD}

\begin{table}
\caption{Equipment in Basic Electric Laboratory}
\label{TABLE:EQUIPMENT_LAB_LLD}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

%%%%%%%%%=======================================
%%%%%%%%%========= SUBSECTION BARU =============
\subsection{\lablski}
\label{SUBSEC:EQUIPMENT_LAB_LSKI}

\begin{table}
\caption{Equipment in Control and Instrumentation System Laboratory}
\label{TABLE:EQUIPMENT_LAB_LSKI}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

%%%%%%%%%======================================
%%%%%%%%%========== SUBSECTION BARU ===========
\subsection{\labtt}
\label{SUBSEC:EQUIPMENT_LAB_TT}

\begin{table}
\caption{Equipment in High Voltage Laboratory}
\label{TABLE:EQUIPMENT_LAB_TT}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

%%%%%%%%%======================================
%%%%%%%%%============= SUBSECTION BARU ========
\subsection{\labelda}
\label{SUBSEC:EQUIPMENT_LAB_ELDA}

\begin{table}
\caption{Equipment in Power Electronics Laboratory}
\label{TABLE:EQUIPMENT_LAB_ELDA}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

%%%%%%%%%======================================
%%%%%%%%%======= SUBSECTION BARU ================
\subsection{\labkomjar}
\label{SUBSEC:EQUIPMENT_LAB_KOMJAR}

\begin{table}
\caption{Equipment in Computer Hardware \& Networking and Software Engineering Laboratory}
\label{TABLE:EQUIPMENT_LAB_KOMJAR}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}

%%%%%%%%%======================================
%%%%%%%%%========= SUBSECTION BARU ============
\subsection{\labtelmat}
\label{SUBSEC:EQUIPMENT_LAB_TELMAT}

\begin{table}
\caption{Equipment in Telematics Laboratory}
\label{TABLE:EQUIPMENT_LAB_TELMAT}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}


%%%%%%%%%============= SUBSECTION BARU ================
\subsection{\labantena}
\label{SUBSEC:EQUIPMENT_LAB_ANTENA}

\begin{table}
\caption{Equipment in Antenna and Propagation Laboratory}
\label{TABLE:EQUIPMENT_LAB_ANTENA}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}


%%%%%%%%%============= SUBSECTION BARU ================
\subsection{\labtelkom}
\label{SUBSEC:EQUIPMENT_LAB_TELKOM}

\begin{table}
\caption{Equipment in Telecommunication, Radio, and Microwave Laboratory}
\label{TABLE:EQUIPMENT_LAB_TELKOM}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | P{6.2cm} | P{0.6cm} | P{6.4cm}|}
\hline
No. & Equipment & Qty & Function  \\
\hline
1 &  &  &  \\

2 &  &  &  \\

3 &  &  &  \\

4 &  &  &  \\
\hline
\end{tabular}
\end{table}



%%%%%%%%%======= SECTION BARU ================
\section{Other Supporting Equipment}
\label{SEC:OTHER_TEACHING_SUPPORT}