%\appendix
\chapter{EQUIPMENT}
\label{APPENDIX:EQUIPMENT}

\textbf{\underline{Not yet applicable}} for Readiness Review.



%%%%%%%%%============= SUBSECTION BARU ================
\subsection{\labelvis}
\label{SUBSEC:EQUIPMENT_LAB_ELVIS}

The \labelvis ~houses some manufacture and measurement equipment as well as software tools.
The equipment and software tools are used in some courses and practical courses.
Table~\ref{TABLE:EQUIPMENT_LAB_ELVIS} presents some equipment, their functionality and
related courses that use the equipment.


\begin{table}[h]
\caption{Equipment in Electronics and Devices Laboratory}
\label{TABLE:EQUIPMENT_LAB_ELVIS}
\fontsize{10}{10}\selectfont
\begin{tabular}{| l | p{4cm} | p{4cm} | p{4cm} |}
\hline
No. & Equipment & Function & Course Related \\
\hline
1 & PCB Manufacture Equipment (Figure~\ref{FIG:PCB_MANUFACTURE}) & To assembly and manufacture PCB &  \\
2 & 3D Printer (Figure~\ref{FIG:PCB_MANUFACTURE}) & To make 3D profiles &  \\
3 & 3D Stereolithography Printer  (Figure~\ref{FIG:PCB_MANUFACTURE}) & To make 3D profiles &  \\
4 & Mixed-Signal Oscilloscope (Figure~\ref{FIG:PCB_MANUFACTURE}) & To measure analog and digital signals &  \\
5 & Mixed Sognal Oscilloscope,  Oscilloscope , 4 channel (Figure~\ref{FIG:PCB_MANUFACTURE}) & To measure analog and digital signals &  \\
5 & Digital Storage Oscilloscope , 4 channel (Figure~\ref{FIG:PCB_MANUFACTURE}) & To measure analog and digital signals &  \\
6 & Digital Storage Oscilloscope, 2 channel (Figure~\ref{FIG:PCB_MANUFACTURE}) & To measure analog and digital signals &  \\
7 & Function Generator (Figure~\ref{FIG:PCB_MANUFACTURE}) & To generate signals &  \\
8 & Frequency Generator (Figure~\ref{FIG:PCB_MANUFACTURE}) & To generate signal with variable frequency &  \\
5 & Digital Storage Oscilloscope , 4 channel (Figure~\ref{FIG:PCB_MANUFACTURE}) & To measure analog and digital signals &  \\
\hline
\end{tabular}
\end{table}


\begin{figure}
\centering
\includegraphics[width=0.9\columnwidth]{ISI/APPENDIX_C/FIG_ELVIS/PCB_MANUFACTURE.JPG}
\caption{PCB Manufacture Equipment.}
\label{FIG:PCB_MANUFACTURE}
\end{figure}



Table~\ref{TABLE:SOFTWARE_LAB_ELVIS} shows some software tools, their functionality and their usability in some courses.




